Fake Impact Parameter

0

100

200

300

400

500

600

700

800

900

1000

0 0.05 0.1 0.15 0.2 0.25 0.3 0.35 0.4

Impact Parameter (μm)

Events/0.004 μm

Beam Tilt 400 rad