Single Electron, p_T =20GeV

0

50

0 1 2 3

Entries 387

1.865 / 5 Constant 81.12 5.656 Mean 0.8773 0.1059E-01 Sigma 0.1797 0.9602E-02

Use STT in track p_{T fit}

0

50

0 1 2 3

Entries 476

6.203 / 8 Constant 78.85 5.006 Mean 0.8185 0.1175E-01 Sigma 0.2317 0.1098E-01

Use CFT p_T (b) for track

0

25

50

0 1 2 3

Entries 476

12.38 / 9 Constant 51.53 3.412 Mean 0.8418 0.2233E-01 Sigma 0.3439 0.2272E-01

Use CFT p_T (a) for track

E_T/p_T

Number of events