Single Electron, p_T =5GeV

0 25 50

0 1 2 3

Entries 204

9.877 / 4 Constant 64.47 6.212 Mean 0.7351 0.9657E-02 Sigma 0.1226 0.8999E-02

Use STT in track p_{T fit}

0

50

0 1 2 3

Entries 243

7.777 / 4 Constant 72.71 6.773 Mean 0.7391 0.9565E-02 Sigma 0.1326 0.1041E-01

Use CFT p_T (b) for track

0

25

50

0 1 2 3

Entries 243

16.90 / 6 Constant 61.31 6.113 Mean 0.7910 0.1111E-01 Sigma 0.1478 0.1175E-01

Use CFT p_T (a) for track

E_T/p_T

Number of events