z_{vtx}=0 σ_z=0.5 mm 25% wrong vertex |z_{vtx}|Λ30 cm

electron p_T (GeV) efficiency

0

0.2

0.4

0.6

0.8

1

10 12 14 16 18 20 22 24 26 28 30