0 25 50 75 100 125 150 175 200

-0.4 -0.2 0 0.2 0.4

6.323 / 4 Constant 197.1 10.99 Mean -0.4820E-01 0.2328E-02 Sigma 0.5237E-01 0.1800E-02

Resolution : 525 microns

Zvertex (found) - Zvertex (closest MC vertex) (cm)

Number of events