40 50 60 70 80 90 100

0 1 2 3 4 5

L2JET-2-MED tt 5 all jets -

Ο 1 track Ο 2 tracks Ο 3 tracks

Signal Efficiency (Ψ)

0 20 40 60 80

0 1 2 3 4 5 S_{min}

QCD Bgd. Rates (Hz)