\begin{figure} 
\vspace{2.0in} 
\special{psfile=stt_delay1.0.ps hscale=70 vscale=70
hoffset=-50 voffset=300 angle=-90} 
\caption{Schematic of one sextant of the STT.}
\label{stt_delay1.0} 
\end{figure}
    

\begin{figure} 
\vspace{3.5in} 
\special{psfile=main2.0.ps hscale=70 vscale=70
%hoffset=-50 voffset=350 angle=-90} down .75 in 
hoffset=-50 voffset=400 angle=-90} 
\caption{Schematic of the main STT simulation. }
\label{main2.0} 
\end{figure}

\begin{figure} 
\vspace{3.5in} 
\special{psfile=tracks.ps hscale=70 vscale=70
hoffset=-50 voffset=350 angle=-90} 
\caption{Schematic of the hyper-exponential track generation galaxy. }
\label{tracks} 
\end{figure}

\begin{figure} 
\vspace{3.0in} 
\special{psfile=track.ps hscale=70 vscale=70
hoffset=50 voffset=20 angle=0} 
\caption{Track multiplicity distribution }
\label{track} 
\end{figure}

\begin{figure} 
\vspace{3.5in} 
\special{psfile=hits.ps hscale=70 vscale=70
hoffset=-50 voffset=350 angle=-90} 
\caption{Schematic of the double-Gaussian hit generation galaxy. }
\label{hits} 
\end{figure}

\begin{figure} 
\vspace{3.0in} 
\special{psfile=hit.ps hscale=70 vscale=70
hoffset=50 voffset=20 angle=0} 
\caption{Hit multiplicity distribution }
\label{hit} 
\end{figure}

\begin{figure} 
\vspace{3.5in} 
\special{psfile=SMT.ps hscale=70 vscale=70
hoffset=-50 voffset=350 angle=-90} 
\caption{ Schematic of the SMT processor galaxy.}
\label{SMT} 
\end{figure}



\begin{figure} 
\vspace{3.0in} 
\special{psfile=fit_time.ps hscale=70 vscale=70
hoffset=50 voffset=-175 angle=0} 
\caption{Fitting time for one TFC processor.}
\label{fit_time} 
\end{figure}

\begin{figure} 
\vspace{3.5in} 
\special{psfile=PCI_bus.ps hscale=150 vscale=150
hoffset=-50 voffset=400 angle=-90} 
\caption{ Schematic of the PCI bus galaxy showing delay chains for 
the STC roads, STC output, and bus logic.}
\label{PCI_bus} 
\end{figure}


\begin{figure} 
\vspace{3.0in} 
\special{psfile=delay.ps hscale=70 vscale=70
hoffset=20 voffset=20 angle=0 }
\caption{Latency of one STT sextant.}
\label{delay} 
\end{figure}

\begin{figure} 
\vspace{3.0in} 
\special{psfile=buffer.ps hscale=70 vscale=70
hoffset=20 voffset=20 angle=0 }
\caption{Occupancy of the TFC buffer.}
\label{buffer} 
\end{figure}
